-- [REACTIONS]

drop table if exists reactions_roughness_correlation;

drop table if exists reactions_limiting_potential;

drop table if exists reactions_tank;

drop table if exists reactions_pipe;

drop type if exists reactions_pipe_param;

drop table if exists reactions_global;

drop type if exists reactions_global_param;

drop table if exists reactions_order;

drop type if exists reactions_order_param;
