-- [REACTIONS]

create table reactions_global
(
  _no integer primary key
, order_bulk numeric
, order_wall numeric
, order_tank numeric
, global_bulk numeric
, global_wall numeric
, limiting_potential numeric
, roughness_correlation numeric
);

insert into reactions_global values (0, null, null, null, null, null, null, null);

create table reactions_pipe_bulk
(
  pipe  varchar(32) primary key references pipes(id) not null
, value numeric not null
);

create table reactions_pipe_wall
(
  pipe  varchar(32) primary key references pipes(id) not null
, value numeric not null
);

create table reactions_tank
(
  tank  varchar(32) primary key references tanks(id) not null
, value numeric not null
);
